(40,10) ()
 [MMC 212] Arlarm Ringing Station
 --------------------------------------
 Used to determine which devices will 
 be alerted when an alarm sensor is 
 activated.

 ** Default : DAY   500
              NIGHT 500
 ** Related Items
    MMC 213 Alarm Rining Message

