(40,10) ()
 [MMC 412] Assign Trunk Signal
 --------------------------------------
 Allows for the assignment of analogue 
 DID or AC15 PCBs for proper signalling.
 
 ** Types
   IMMEDIATE (default)
   DELAYED
   WINK

 ** Related Items
   MMC 714 DID Number and names 
           Translation
    
 




