(40,10) ()
 [MMC 608] Assign CLIP(CID)review block
 --------------------------------------
 Provides a means of adding or deleting 
 CLIP(CID) review blocks to an 
 individual keyset.
    
 * The system automatically assigns 10
   bins to each keyset. Each keyset may
   be assigned a maximum of 50 bins

 Default Data: One bin of 10 entries 




