(40,10) ()
 [MMC 740] Station Pair
 -------------------------------------
 Allows a DECT station to be assigned
 as a 'secondary' to a 'primary' 
 station in the system. This will 
 allow all features to be set or 
 cancelled from either station, and 
 both will ring when the 'Primary'
 receive a call.

 ** default : NONE
 ** Related items : NONE