(40,10) ()
 [MMC 743] DBS Status
 --------------------------------------
 Used for checking the status of DECT
 base stations(DBS).

 ** Related Items
   MMC 737 DECT System Code
   MMC 738 DECT Clear registeration
   MMC 739 BSI Download
   MMC 741 BSI Card Restart
   MMC 742 BSI Status
   MMC 744 BSI Registration ON/OFF
   MMC 745 BSI RF Carrier