(40,10) ()
 [MMC 204] Common Bell Control
 --------------------------------------
 Determines whether the common bell 
 relay contacts have an interrupted or
 continuous closure when activated.

 If interrupt is chosen, the relay 
 follows an internal C.O. ring pattern 
 of one second closed followed by three 
 seconds open.

 ** Default : Continuous
 ** Related Items
    MMC 203 Assign UA Device
    MMC 219 Common Relay Service Type
    MMC 601 Assign Station Group




