(40,10) ()
 [MMC 215] Voice Dialler Options
 --------------------------------------
 Assigns the VDIAL PCB with 2 channels 
 and 7 users or 1 channel and 5 users.
  
 * 2CH-7USER-20BIN : 7 users
 * 1CH-5USER-40BIN : 5 users

 ** default :2CH-7USER-20BIN   
 ** Related Items
    MMC 216 Voice Dialler


