(40,10) ()
 [MMC 735] AA Use Table
 -------------------------------------
 This MMC assigns AA PLAN TABLE to 
 either an individual AA port or AA
 group.
 
 ** USED PLAN TABLE NUMBER : 1 - 12
 ** Default : Plan 01