(40,10) ()
 [MMC 604] Assign Station To Page Zone
 -------------------------------------
 Allows the technician to assign a 
 keyset to any of the four internal 
 paging zones and all page(*).
 The total number of keysets that can
 receive a page is limited to 80 for
 DCS and 40 for Compact II.

 ** Default 
    No Station Assigned
    All Zone is set
 
                       


