(40,10) ()
 [MMC 601] Assign Station Group
 -------------------------------------
 This program assigns staton group.
 The station group that are available 
 in this MMC will provide more
 flexibility in the usage of Uniform
 Call Distribution(UCD/ACD), AA GROUP
 and VM/AA application.

 ** Station group type :
    - Normal group
    - VMAA group : can only distribute
         or sequential ringing.
    - UCD group : has wrapup capability.
    - AA group : can only distribute or 
         sequential ringing.

 ** Related Items
   MMC 203 Assign UA Device
   MMC 204 Common Bell Control
   MMC 211 Door Ring Assignment
   MMC 212 Alarm Ring Station
   MMC 406 Trunk Ringing Assignment
   MMC 601 Assign Station Group
   MMC 602 Station Group Name
