(40,10) ()
 [MMC 600] Assign Operator Group
 -------------------------------------
 Used to assign operator group for
 day and night.

 ** Default 
    DAY  : 500
    NIGHT: 500
 ** Related Items
   MMC 211 Door Ring Assignment
   MMC 212 Alarm Ring Station
   MMC 406 Trunk Ringing Assignment
   MMC 601 Assign station Group
   MMC 602 Station Group Name
 

