(40,10) ()
 [MMC 506] CO Tone Cadence
 -------------------------------------
 Provides the ability to customize the
 tone cadence provided from the analog
 Trunk on a system-wide basis.
 There are 3 types of tones available 
 through this MMC.
 
 Note) In key MMC 506, you can program
       both CO and system basis tone
       cadance.
 Related Items
   "Tone Cadance" in PCMMC 
  

