(40,10) ()
 [MMC 741] Tax Rate Setup
 -------------------------------------
 Allows the technician to set up the 8
 tax rates used in MMC 740.

 ** Tax Rate : 1 - 8
 ** Type     : Type of tax and defines
     if the VALUE is applied as a % of
     the cost of an item or is added
     as a fixed dollar value to an item.
 ** Value    : Actual tax rate
 ** Name     : 10 character name
