(40,10) ()
 [MMC 119] Set CLIP(CID) Display
 ------------------------------------
 allows the technician to change 
 the order in which the CLIP(CID) 
 information is displayed on an 
 LCD set.
  
 Display Options)
  0 = NO DISPLAY
  1 = NUMBER FIRST
  2 = NAME FIRST

 Default Data : Number First
 Related Items: MMC 312
  





