(40,10) ()
 [MMC 109] Date Display
 --------------------------------------
 Allows the system administrator or 
 technician to select the date and time 
 display mode on a per-station basis or 
 system-wide.

 Date mode

  ORIENTAL : oriental/upper case
  oriental : oriental/lower case
  WESTERN  : western /upper case
  western  : western /lower case

  * display format)
     ORIENTAL: MM/DD DAY HH:mm
     WESTERN : DAY DD MON HH:mm

 CLOCK(time mode)
     12 HOUR//24 HOUR
 
 Default : Western/12 hour/lower case




