(40,10) ()
 [MMC 502] Station-Wide Timers
 --------------------------------------
 Allows certain station timer values to
 be changed on a per station basis or
 for all stations. 

 * NO ANS FWD  : 001 - 255 SEC(015)
 * DTMF DUR    : 0100 -9900 msec(100)
 * F-DGT DELAY : 0100 -9900 msec(600)

 Related Items
   MMC 102 Call Forward
   MMC 207 Assign VM/AA Port
   MMC 726 VM/AA Options



