(40,10) ()
 [MMC 207] Assign VM/AA Port
 --------------------------------------
 Enables SLI ports to be designated as 
 NORMAL or VMAA.   

 Default) Normal Port

 Related Items
  MMC 726 VM/AA options
  MMC 601 Station Group 




