(40,10) ()
 [MMC 318] Distinctive Ring
 -------------------------------------
 Sets a distinctive ring for stations.
 
 ** set values : 
   Ring Tone : 1..8, F-STN
   Cadance   : 1..5, F-STN

 ** default
   Ring Tone : F-STN
   Cadance   : F-STN   
