(40,10) ()
 [MMC 414] CID/CLIP TRUNKs
 --------------------------------------
 Used to determine the CID/CLIP Trunk.
 
 ** mode
    NORMAL
    CID/CLIP

 ** Default : NORMAL
 ** Related Items
   MMC 312 Allow CID/CLIP
   MMC 728 CID/CLIP Translation
   MMC 119 CID Display
   MMC 415 TRK Abandon
   MMC 608 CID Block
