(40,10) ()
 [MMC 408] Assign Trunk MOH Source
 --------------------------------------
 Allows the system administrator to 
 select which Music On Hold(MOH) source 
 can be heard on each trunk.    
 
 ** mode 
   MOH
   TONE
   NONE   
 
 ** In case of MOH selection, directory
    number should be entered.



