(40,10) ()
 [MMC 420] Pri Option(Trunk Mode)
 --------------------------------------
 Allows the system the ability of DDI/
 NORMAL access. If your PRI line is not
 registered for DID service at the C.O,
 you can use NORMAL service. If you set
 PRI MODE to DDI, you can service DID
 to a specific station or station group
 to DID NUMBER TABLE.
 
 ** OPTIONs
   DDI
   NORMAL

 ** Related Items
  MMC 418 Card Restart
  MMC 406 Trunk Ring Assignment
  MMC 714 DID Number and Name
          Translation 
