(40,10) ()
 [MMC 418]or[MMC 427] R2MFC Signal
 --------------------------------------
 Assigns signal type of R2MFC signal
 flow for trunk that uses R2MFC dial
 type.
 
 ** OPTIONS     ** DEFAULT
  CLG CLS REQ        ON
  CLG NUM REQ        OFF
  CLD STS RESP       ON
  CLG CLS RESP       ON
  CLG NUM RESP       ON
  CLD STS REQ        ON
  CLG EXT RESP       OFF

 ** Related items
  MMC 402 Trunk Dial Type
  MMC 501 System Timer