(40,10) ()
 [MMC 402] Trunk Dial Type
 --------------------------------------
 Used to determine the dialing type of 
 each C.O. line. 

 ** OPTIONs
   PULSE
   DTMF  (Default)
   R2MFC
 
 ** Related Items
   MMC 501 System Timers
   MMC 503 Trunk Wide Timers
    
 




