(40,10) ()
       [MMC 503] Trunk-wide Timer
 --------------------------------------
 Allows certain trunk timer values to 
 be changed on a per-trunk basis or for
 all trunks.
 
 ** Items
   Trunk Release (100 -5000msec) 
   DTMF Duration (100 -2500msec)
   F-dgt Delay   (100 -2500msec)
   Trk Pause     (001 -255sec)
   Trk Flash     (100 -2500msec)
   Trk Wink Start(100 -300msec)
   Trk No Ring   (001 -255sec)
   Trk Ring detect(100-2500msec)
   Co Supervision(100 -2500msec)
   Trk Ans Back  (100 -2500msec)
   PRS Detect    (000 -2500msec)
   D/P Interval  (100 -9900msec)
   MFR Delay     (00  -25sec)
    
 




