(40,10) ()
 [MMC 203] Assign UA Device
 --------------------------------------
 Assigns ringing device to be accessed 
 when a Universal Answer(UA)key is 
 pressed or the UA pickup code is 
 dialed.

 The device type is automatically 
 determined by the directory number(DN)
 entered.
 ** Default : NONE
 ** Related Items
   MMC 204 Common Bell Control
   MMC 219 Common Relay Service Type
   MMC 601 Assign Station Group
   MMC 605 Assign External Page Zone 



