(40,10) ()
 [MMC 504] Pulse Make/Break Ratio
 --------------------------------------
 Allows the ability to change the value 
 of pulses per second and the duration
 of the make/break time. This will only 
 affect rotary dial trunks.
 
 ** OPTIONs 
   - Pulse per second :  10 or 20
   - Make's portion   : 
      Make/Break ratio ( 1 ~ 99 )        
 ** Related Items
   MMC 402 Trunk Dial Type





