(40,10) ()
 [MMC 510] SLI Ring Cadance
 -------------------------------------
 Used to set ring cadance for SLI port.

 ** OPTIONs
   STATION    : FIRST,SECOND ON/OFF
   TRUNK      :      ""
   DOOR       :      ""
   ALARM      :      ""
   CBK        :      ""






