(40,10) ()
 [MMC 500] System-wide Counters
 --------------------------------------
 Used to set the values of the system
 counters.
 ** OPTIONs & Range 
  - Auto rdl counter           : 1 - 99
  - Alarm rem counter          : 1 - 99
  - New call counter           : 1 - 99
  - DISA lockout counter       : 1 - 99
  - DISA intercom call counter : 1 - 99
  - UCDS v-alarm               : 0 - 25
  - UCDS a-alarm               : 0 - 25
  - UCDS CS Level 1            : 0 - 25
  - UCDS CS Level 2            : 0 - 25

 ** Related Items
   MMC 501 System Wide Timers 


