(40,10) ()
 [MMC 804] System I/O Parameter
 -------------------------------------
 Provides a means of setting
 parameters for the system I/O ports
 to work with one of the followings:
  . a personal computer
  . with SMDR recording
  . with UCD statistics report/
    periodic UCD informations
  . CTI(TSAPI) Interface
 ** PARAMETER OPTIONs
   -SERVICE TYPE    
   -BAUD RATE
   -CHARACETR LENGTH
   -PARITY TYPE
   -STOP BIT
   -RETRY COUNT
   -DSR CHK
   -WAIT TIME

 



