(40,10) ()
 [MMC 808] T1 Trunk Coding(Parameter)
 -------------------------------------
 Provides a means to set the
 parameters needed to meet the 
 requirements of a T1 spec.

 ** CODING FORMAT
   0 AMI 
   1 B8ZS 



