(40,10) ()
 [MMC 210] Customer On/Off Per Tenant
 -------------------------------------
 Allows the system administrator to 
 set in the system features on a per-
 tenant basis. 

 ** OPTIONs
   -DISA PSWD
   -LCR ENABLE
   -SMDI VMS SET
   -PERI UCD SET
   -CID CODE INS
   -DISA MOH
   -TRANSFER MOH
   -DSP SSPDNAME
   -DID BSY ROUT
   -DID NOT ROUT
   -ALL PICK UP
   -ARD TONE CHK